<script setup>
	import FacilityInfor from './components/FacilityInfor.vue'
	import MoniInfor from './components/MoniInfor.vue'
</script>

<template>
	<jt-popup2 title="土壤墒情监测" ref="FacilityInfor">
		
		<MoniInfor></MoniInfor>
	</jt-popup2>
	
	<jt-popup2 title="" top="calc(calc(100% - 115rem) / 3 + 90rem)" ref="">
    
	</jt-popup2>
	
	<jt-popup2 title="" top="calc(calc(100% - 115rem) / 3 + calc(100% - 115rem) / 3 + 90rem)" ref="">
		
	</jt-popup2>
	
	
	<!-- <jt-popup3 title="用水量统计" ref="ysltj">
	
	</jt-popup3>
	
	<jt-popup3 title="能耗同比统计" top="calc(calc(100% - 115rem) / 3 + 90rem)" ref="nhtbtj">
	
	</jt-popup3>
	
	<jt-popup3 title="智能监控" top="calc(calc(100% - 115rem) / 3 + calc(100% - 115rem) / 3 + 90rem)" ref="znjk"> -->
	
	
	
	<jt-popup3  title="设备数量统计" ref="FacilityInfor">
		 <FacilityInfor></FacilityInfor> 
	</jt-popup3>
	
	<jt-popup3  title="" top="calc(calc(100% - 115rem) / 3 + 90rem)" ref="">
		
	</jt-popup3>
	
	<jt-popup3  title="" top="calc(calc(100% - 115rem) / 3 + calc(100% - 115rem) / 3 + 90rem)" ref="">
		
	</jt-popup3>
</template>

<script>
</script>

<style>
</style>