<script setup>
	
</script>

<template>
	<jt-popup2  title="灌溉设备统计" ref="ggsbtj">
		
	</jt-popup2>
	
	<jt-popup2  title="设备运行检测" top="calc(calc(100% - 115rem) / 3 + 90rem)" ref="sbyxjc">
		
	</jt-popup2>
	
	<jt-popup2  title="灌溉水位监测" top="calc(calc(100% - 115rem) / 3 + calc(100% - 115rem) / 3 + 90rem)" ref="qtnhzb">
		
	</jt-popup2>
	
	<jt-popup3  title="用水量统计" ref="ysltj">
		
	</jt-popup3>
	
	<jt-popup3  title="能耗同比统计" top="calc(calc(100% - 115rem) / 3 + 90rem)" ref="nhtbtj">
		
	</jt-popup3>
	
	<jt-popup3  title="智能监控" top="calc(calc(100% - 115rem) / 3 + calc(100% - 115rem) / 3 + 90rem)" ref="znjk">
		
	</jt-popup3>
</template>

<script>
	export default {
		name: 'Test',

		/* 数据 */
		data() {
			return {
				
			}
		},

		/* 方法 */
		methods: {

		},
		// ?tableName=map_region&sqlWhere=&orderByField=
		/* 初始化 */
		mounted() {

		},
	}
</script>

<style scoped>
	
</style>
